Scale chr4: Gap

miRNA ncRNA tRNA miscRNA

RepeatMasker

20 bases dm6 311,840 311,850 311,860 311,870 311,880 311,890 311,900 311,910 311,920 Gap Locations

FlyBase Protein-Coding Genes

FlyBase Pseudogenes FlyBase Non-protein Coding Genes

Repeating Elements by RepeatMasker

Zip102B-RB Zip102B-RD Zip102B-RF Zip102B-RE