Scale chr4: ---> Gap

RepeatMasker

2 bases dm6 310,916 310,917 310,918 310,919 310,920 310,921 T A A T T A A Gap Locations

FlyBase Protein-Coding Genes FlyBase Pseudogenes FlyBase microRNAs FlyBase Non-coding RNAs FlyBase tRNAs FlyBase snRNAs, snoRNAs, and rRNAs Repeating Elements by RepeatMasker