Scale chr4: Gap

miRNA ncRNA tRNA miscRNA

RepeatMasker

2 kb dm6 392,000 393,000 394,000 395,000 396,000 397,000 398,000 399,000 Gap Locations

FlyBase Protein-Coding Genes

FlyBase Pseudogenes FlyBase Non-protein Coding Genes

Repeating Elements by RepeatMasker dati-RC dati-RA dati-RB