Scale scaffold_4512: Gap

RepeatMasker

1 kb DereCAF1 970,500 971,000 971,500 972,000 972,500 973,000 973,500 Gap Locations BLAT Alignments of NCBI RefSeq Genes

Spaln Alignment of D. melanogaster Proteins

GeMoMa Gene Predictions Geneid Gene Predictions Augustus Gene Predictions RNA-Seq from Adult Males

RNA-Seq from Ovarian Follicle Cells

Repeating Elements by RepeatMasker

XR_003408186 XM_001982700 Rad23-PB Rad23-PA Rad23-PC FBTR0089122_R0 mRNA_geneid-scaffold_4512_36 scaffold_4512.g44.t1 Adult Males

515 _ 1 _ Ovarian Follicle Cells

287 _ 1 _